7500 7600 7700 7800 7900 8000 8100 8200 8300 8400

Frequency, MHz. 0 1 2 3 4 5 6 7 8 9 10 11 12

Amplitude.

VLBA RFI @ 4cm, 7.50 - 8.34 GHz

1999 OCT 07 UT 00-00.

4 [LA]