265.0 280.0 295.0 310.0 325.0 340.0 355.0 370.0 385.0

Frequency, MHz. 0.0 1.0 2.0 3.0 4.0 5.0 6.0 7.0 8.0 9.0 10.0

11.0

12.0

13.0

14.0

15.0

Amplitude.

VLBA RFI @ 90cm, 265-385 MHz

2000 FEB 26 UT 19-03.

1 [BR] 2 [FD] 3 [KP] 4 [LA] 5 [MK] 6 [NL] 7 [OV] 8 [PT] 9 [SC]