590 605 620

Frequency, MHz. 0

5

10

15

Amplitude.

VLBA RFI @ 50cm, 545 - 665 MHz (609-613 filter)

1998 jan 21 UT 06-11.

1 [BR] 2 [FD] 3 [HN] 4 [LA] 6 [NL] 7 [OV] 8 [PT] 9 [SC]