600.0 605.0 610.0 615.0 620.0

Frequency, MHz.

-2.0

0.0

2.0

4.0

6.0

8.0

10.0

12.0

14.0

16.0

Amplitude.

VLBA RFI 50cm.

950729

BR FD HN KP LA MK NL OV PT SC