1700 1705 1710 1715 1720 1725 1730 1735 1740

Frequency, MHz. 0 1 2 3 4 5 6 7 8 9 10 11 12

Amplitude.

VLBA RFI @ 20cm, 1700 - 1740 MHz

2000 FEB 26 UT 19-17.

1 [BR] 2 [FD] (RF filter:1339-1756) 3 [KP] (RF filter:1333-1843) 4 [LA] 5 [MK] 6 [NL] 7 [OV] 8 [PT] 9 [SC] (IF filter:see Website)